In Memoriam: Sheldon Disrud

An early director of choral music who helped many Chapman University alumni launch singing and music education careers, Sheldon Disrud has died. He passed away Dec. 13 in Fullerton, Calif. He was 91. Disrud was among the first faculty who joined Chapman when it moved to Orange in 1954. Among his students was […]

The post In Memoriam: Sheldon Disrud appeared first on Chapman Newsroom.